Table of Conventions
 Conventions

In this help file, the functions are described with  the syntax provided in C-language format.  In your source files, the function name must be spelled exactly as shown in syntax, and the parameters must be used in the order shown.

Help File Conventions

The following conventions are used throughout this Help file.

Convention	Meaning
Bold text	Indicates a term or character to be typed literally, such as a resource-definition statement or function (for example, FILE or FTPClose). You must type these terms exactly as shown.
Italic text	Indicates a placeholder or variable. You must provide the actual value (for example, the statement SetCursorPos(X,Y) requires that you add actual values for the X and Y parameters.
[ ]	Encloses optional parameters.
|	Separates an either-or choice.
...	Represents omitted text before or after existing text.
monospace	Identifies code examples and shows syntax spacing.